]^2

[GeV 2Q 10^210

D(3)

rσ _{IP} . x^l3

-2 10

-1 10

1

10

210

310

410 =0.005 (l=11) β =0.008 (l=10) β =0.013 (l=9) β =0.02 (l=8) β =0.03 (l=7) β =0.05 (l=6) β =0.08 (l=5) β =0.13 (l=4) β = 0.2 (l=3) β =0.32 (l=2) β = 0.5 (l=1) β

= 0.8 (l=0) β

=0.01 IPx < 1.6 GeV) Y H1 LRG (M H1 FPS HERA-II x 1.2

H1 2006 DPDF Fit B (extrapol. fit)

H1