μη -1 0 1

[pb] μ η/dσd

0 5 10 15 20 25 μ

0 5

Xμ ejj →Xb eb → H1 Cross section: ep

>0.75 obs γx H1 Data 06/07 PYTHIA CASCADE HERWIG MC@NLO

μ

0 5