]^o [_hγ

20 40 60 80 100 120 140 160 180

DA/y_hy

0.9 0.92

0.94

0.96

0.98 1 1.02

1.04

1.06

1.08 1.1 NC Data NC MC 1% ± NC MC

H1 Collaboration

HERA II