[GeV] cM 1.2 1.4 1.6 1.8

)_c (M 2χ

600

650

700

750 RT standard RT optimised ACOT-full χ S-ACOT- ZM-VFNS

opt_C M

H1 and ZEUS

Charm + HERA-I inclusive