[GeV] cM 1.2 1.4 1.6 1.8

[nb] +Wσ

54 56 58 60 62 64 opt C M RT standard RT optimised ACOT-full χ S-ACOT- ZM-VFNS

= 7 TeV s

Charm + HERA-I inclusive

H1 and ZEUS