*η 0 1 2 3 4 5 6

*ηd dn N 1

0

1

2

3 * < 1 GeV

T p H1

H1 data

RAPGAP

CTEQ6L(LO) CTEQ66 GRV98 NLO HERAPDF1.0

N 1

0

1

2

3