]^2

-t [GeV

0 0.2 0.4 0.6 0.8 1 1.2

]^2 p) [nb/GeV ψ J/

→ p γ( dt σd

1

10

210 photoproduction ψ H1 elastic J/

2 = 0.1 GeV

〉^2Q〈

< 110 GeV pγ 40 GeV < W

H1 data HE

Fit HE, H1(03)

ψ