[GeV] pγW 40 60 80 100 p) [nb] ψ J/

→ p γ(σ

0 20 40 60 80 100 120 photoproduction ψ H1 elastic J/

2 = 0.1 GeV

〉^2Q〈_2 |t| < 1.2 GeV

H1 data HE H1 data LE Fit HE, LE, H1(2005)

ψ