W [GeV]

100 150 200

DIS σ / n DIS σ

0

0.1

0.2

0.3_{H1 Data}

correlated uncertainty SIBYLL 2.1 EPOS LHC QGSJET II-04 QGSJET 01

Forward Neutrons H1