Fx 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

MC/Data

0

1

2

3 H1 Data SIBYLL 2.1 EPOS LHC QGSJET II-04 QGSJET 01 QGSJET 01 (no mi)

Forward Neutrons 190 < W < 245 GeV H1