[GeV] XM 10 20 30 ratio to NLO

0.5 1 1.5 [GeV] XM 10 20 30

[pb/GeV] X /dM σd

1 2 3 H1_{DIS}

H1 VFPS data ) hadr δ (1+ × 0.83 × NLO H12006 Fit-B