IPz 0 0.2 0.4 0.6 0.8 ratio to NLO

0.5 1 1.5 IPz 0 0.2 0.4 0.6 0.8

[pb] IP /dz σd

500

1000

H1_{pγ}

H1 VFPS data ) hadr δ (1+ × 0.83 × NLO H12006 Fit-B

-PDF γ AFG