W_{γp} [GeV] σγp [nb]

20 40 60 80 100 0 100 200 300 400 500

0

H1 data

0 POMPYT 0 fit W^δ (δ=--0.26+---0.06_{stat} +---0.07_{sys})

H1 ρ^0 with Forward Neutron