]^2

[GeV 2Q 10

]^2 [pb/GeV

2QΔ/_{NC}σ

210

310

H1 NC DIS Syst. uncertainties NLO (ZM-VFNS,NNPDF3.0) NNLO (FONLL-C,NNPDF3.0)

H1

]^2

[GeV 2Q 6 7 10 20 30 40 50 60

Ratio to NLO

0.9

1

1.1