]^2

[GeV 2Q 20 40 60 80 100

N(D*)

0

100

200

300

400 H1 Data IP exchange IP p-diss IR exchange

y 0.1 0.2 0.3 0.4 0.5 0.6

N(D*)

0

100

200

300

400

)_{IP}(x_{10} log -3 -2.8-2.6-2.4-2.2 -2 -1.8-1.6

N(D*)

0 100 200 300 400 500 600

obs IPz 0 0.2 0.4 0.6 0.8 1

N(D*)

0 100 200 300 400 500

[GeV]

t,D* p 2 3 4 5 6 7 8

N(D*)

0 100 200 300 400 500

D*η -1.5 -1 -0.5 0 0.5 1 1.5

N(D*)

0 50 100 150 200 250 300