[%] DR 4 6 8 10

< 0.035 IP > 1.9 GeV, x

t,D* p 2003

,^2

< 1 GeV 2 Q ZEUS

< 0.035 IP > 1.5 GeV, x

t,D* p 2003

,^2

< 200 GeV 2 1.5 < Q

ZEUS

< 0.016 IP > 1.5 GeV, x

t,D* p 2002

,^2

< 400 GeV 2 4 < Q

ZEUS

< 0.04 IP > 2 GeV, x

t,D* p 2001

,^2

< 100 GeV 2 2 < Q H1 < 0.03 IP > 1.5 GeV, x

t,D* p 2017

,^2

< 100 GeV 2 5 < Q H1 Diffractive fraction

D* production at HERA