H1 and ZEUS

x -4 10^{-3}10^{-2}10^{-1}10 1

)^2_fμ (x, Σ x

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2 = 1.9 GeV 2 fμ ]_{c,b}

DIS only [fixed m HERAPDF-HQMASS