0 100 200 300 400 500 600

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1 1.25 1.5

E_{etag}Γ2 GeV H1 Data DIS+BH γp+BH

Events

0 200 400 600 800 1000

1200

1400

1600

1800

-1 -0.75-0.5-0.25 0 0.25 0.5 0.75 1 1.25 1.5

E_{etag}Λ2 GeV ISR MC

Analysis cut

Events

Δ