QCDINS CDM-D LEPTO-D HERWIG

Measured region

η

(1/N_{ev}) dn(K^0)/dη

0

0.1

0.2

0.3

0.4

0.5

0.6

0.7

0.8

-1 0 1 2 3 4 5 6