0

100

200

300

0.3 0.35 0.4 0.45 0.5 0.55 0.6 0.65 0.7

H1 Data

π^+ π^- mass ΜGeV^2c^{-2}Ν

No. Combinations per 5 MeV pπ mass ΜGeV^2c^{-2}Ν

No. Combinations per 2 MeV

0

20

40

60

80

100

1.08 1.09 1.1 1.11 1.12 1.13 1.14 1.15