0 0.01

0.02

0.03

0.04

0.05

0.06

-1 -0.5 0 0.5 1

LEPTO (Default) LEPTO-D

H1 Data

η

(1/N_{ev}) dn(Λ)/dη p_T^2 ΜGeV^2c^{-2}Ν

(1/N_{ev}) dn(Λ)/dp_T^2 ΜGeV^{-2}c^2Ν

10^{-2}

0.5 1 1.5 2 2.5 3 3.5 4 4.5