0.3 0.4 0.5 0.6 0.70.80.9 1 1.2 1.4 1.6 1.8 2

M (GeV)

a) ρ_2^u(T) ρ_2^l(T) ρ_1⊗ρ_1(T)

H1 data

1/N dn/dT (GeV^{-1}) b) ρ_2^u(T) ρ_2^l(T) ρ_1⊗ρ_1(T) ρ_2^l(T)+BEC

MC

1/N dn/dT (GeV^{-1}) c) Ratio for ρ_{2u}(T) Ratio for ρ_2^l(T)

H1 data/MEAR(BEC)

T (GeV)

Ratio of densities

0

5

10

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0

5

10

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0

5

10

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

1

1.5

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2