0.3 0.4 0.5 0.6 0.70.80.9 1 1.2 1.4 1.6 1.8 2

M (GeV)

a)

Rate (GeV^{-1}) b)

T (GeV) π^Απ^Α ratio

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2