0.3 0.4 0.5 0.6 0.70.80.9 1 1.2 1.4 1.6 1.8 2 H1 data •

M (GeV) a) 4 ≤ n < 7

Double Ratio RR^{lm} b) 7 ≤ n < 12

Double Ratio RR^{lm} c) n ≥ 12

T (GeV)

Double Ratio RR^{lm}

0.5

1

1.5

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0.5

1

1.5

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0.5

1

1.5

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

0.5

1

1.5

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2