π^+ π^- mass ΜGeVΝ combinations / 6 MeV a)

pπ mass ΜGeVΝ combinations / 1.4 MeV b)

0

1000

2000

0.45 0.475 0.5 0.525 0.55

0

500

1000

1.1 1.11 1.12 1.13 1.14