Ψ =ΛnΓ . P(n)

ΛQΓ = 4.3 GeV ΛQΓ = 6.8 GeV ΛQΓ = 15.9 GeV TASSO E* = 14.0 GeV LEP E* = 91.2 GeV

(a)

ΛQΓ = 4.3 GeV ΛQΓ = 4.3 GeV

JETSET E* = 4.5 GeV

(Flow Selected) (b)

normalised multiplicity z = n/ΛnΓ

Ψ =ΛnΓ . P(n)

H1

H1 10^{-3}

10^{-2}

10^{-1}

1

0 1 2 3 4 5

10^{-3}

10^{-2}

10^{-1}

1

0 1 2 3 4 5