0

1

2

-6 -4 -2 0 2 4 6

0 1 2 3

-6 -4 -2 0 2 4 6

0

2

4

6

-6 -4 -2 0 2 4 6

η^*

1/N dE/dη^* (GeV)

3 < M_X < 8 GeV

H1 1994 DATA RG-F2^D (fit 3) RG-F_2^D (fit 1) LEPTO 6.5

η^*

1/N dE/dη^* (GeV)

8 < M_X < 18 GeV

η^*

1/N dE/dη^* (GeV)

18 < M_X < 30 GeV