10^{-3}

10^{-2}

10^{-1}

1

0 0.5 1 1.5 2 2.5 3 3.5 4

p_T^{*2} (GeV^2)

1/N dn/dp_T^{*2} (GeV^{-2})

H1 1994 DATA 〈M_X〉 = 12 GeV EMC 〈W〉 = 14 GeV

RG-F^D_2 (fit 3) RG-F^D_2 (fit 1) LEPTO 6.5

0.2 < X_F < 0.4