0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

2

3 4 5 6 7 8 9 10

20

0.01 0.02 0.03 0.04 0.05 0.06 0.07 0.08 0.09 0.1

y_2

1/N_{DIS} dn/dy_2

H1 Data MEPJET (Λ = 600 MeV) MEPJET (Λ = 100 MeV) MEPJET (Λ = 320 MeV)