0.105 0.11 0.115 0.12 0.125 0.13

H1

α_s(M_Z^2)

had. energy scale + 4Ψ

+ 0.003 had. energy scale − 4Ψ

− 0.003

θ_{cluster} Γ 5^o ... θ_{cluster} Γ 15^o

− 0.002

variation of θ_{jet}, z_p, y_2 and Q^2 cuts

+ 0.002 − 0.003

model dependence

+ 0.004 − 0.006

parton densities

+ 0.005 − 0.002

variation of ren. scale

+ 0.007 − 0.005

DISENT

− 0.003

systematic error theoretical error statistical error