Energy

0 100 200 300 400 500 600 700 800 900 1000

0 250 500 750 1000

Events/(20 GeV) p-gas data p p 5 n X Monte Carlo (a) H1

E^/ ΜGeVΝ

Energy

0 100 200 300 400 500 600 700 800 900 1000

0 250 500 750 1000

(b) DIS data p-gas data