z = E^//(820 GeV) 0

250

500

750

1000

0 0.25 0.5 0.75 1

Events/0.05

(b)

p_T (GeV) 0

250

500

750

1000

0 0.05 0.1 0.15 0.2

(c)

H1 data Monte Carlo

Events/(0.01 GeV)