-0.5

0

0.5

1

1.5

2

2.5

3

3.5

10^{-3} 10^{-2} β dF_2/d(log Q^2) / F_2

Q^2 = 10 GeV^2 F_2^{LN(3)}(β,Q^2, z = 0.7) F_2^{LP(3)}(β,Q^2, z = 0.732) F_2^π(β,Q^2), GRV-π LO F_2^p(x,Q^2), GRV-p LO

10^{-3} x H1