0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

-2.8-2.64-2.48-2.32-2.16-2-1.84-1.68-1.52-1.36-1.2

0 log x_g^{OBS} dσ_{γp} / d log x_g^{OBS} (μb)

-2.5 2

-1.5

0.3

0.6 H1 D* (γp)

NLO QCD

W = 88 GeV