0

1

2

3

4

5

6

1 10 10^2 10^3 10^4 x=0.05 x=0.032 x=0.02 x=0.013 x=0.008 x=0.005 x=0.0032

(i=1)

(i=2)

(i=3)

(i=4)

(i=5)

(i=6)

(i=7)

Q^2 / GeV^2

F_2+c_i(x)

NMC H1 94 (low Q^2) H1 e^+p 94-97 NLO QCD Fit

c_i(x)= 0.6 • (i(x)-0.4)