0

0.5

0 0.25 0.5 0.75 1

Charged Current

H1 e^+p 94-97 Standard Model (NLO QCD Fit) x=0.08

ϕ_{CC}

0

0.5

0 0.25 0.5 0.75 1

x=0.13

0

0.5

0 0.25 0.5 0.75 1

x=0.25

(1-y)^2