0 25 50 75 100 125 150 175 200

10^{-1} 1

Q^2Γ1000 GeV^2, yΛ0.9

Charged Current H1 e^+p 94-97

x dσ_{CC} /dx / pb

Standard Model (NLO QCD Fit)