0 0.5 1 1.5 2 2.5

10^3 10^4

Q^2 / GeV^2

(dσ_{CC} / dQ^2) / (dσ^{Fit}_{CC} / dQ^2)

tot. error on M_W (± 5.2 GeV) exp. error on M_W (± 3.7 GeV)

Fit result (M_W=80.9 GeV)

Standard Model (M_W=80.4 GeV)

H1 e^+p 94-97