0.3

0.4

0.5

0.6

0.7

0.1 0.12 0.14

α_s(M_Z) α^__0(μ_Ι = 2 GeV)

τ

B ρ

τ_C C ρ_0

Power Correction Fits

(stat. and exp. syst. uncertainties)

H1