0

50

100

150

200

250

0.001 0.002 0.003 x σ (pb/bin)

H1 1994 Preliminary RAPGAP 2.06 ARIADNE 4.08 LEPTO 6.5

x

LO BFKL NLO DISENT

0

50

100

150

200

250

0.001 0.002 0.003