H1 96 PRELIMINARY

H1 94 TASSO (14,22,35,44) TOPAZ (58) LEP (91.2) OPAL (133,161)

MLLA fit (a)

ξ_{peak}

(b)

Q, E^* (GeV) ξ_{width}

1

2

3

4

10 10^2

0

1

2

10 10^2