0 25 50 75 100 125 150 175 200 225 250

0.14 0.15 0.16

Δm (GeV)

# entries / bin

0 20 40 60 80 100 120 140 160

1.6 1.8 2 2.2

m_{D0} (GeV)

# entries / bin