W_{γp}=223 GeV

0 0.2 0.4 0.6 0.8 1 1.2 1.4

-3 -2.75 -2.5 -2.25 -2

log_{10}(x_g^{rec}) dσ_{γp} / dx_g^{rec} (μb)

W_{γp}=185 GeV

0 0.2 0.4 0.6 0.8 1 1.2

-3 -2.75 -2.5 -2.25 -2

log_{10}(x_g^{rec}) dσ_{γp} / dx_g^{rec} (μb)