Q^2 = 2.5 GeV^2 6.5 GeV^2

12 GeV^2 25 GeV^2

-4 -3 -2 -1 0

60 GeV^2

0 log x

F_2^c

stat.

syst.+stat. b contr.

5x AROMA pred.

1994 H1 H1 NLO QCD fit 1996 1996 H1 Preliminary