0 2 4

0 2 4

0 2 4

-2 -1 0 1 2 3 4 5

1/N d E_T / d η^* (GeV)

η^*

< Q^2>

< x > = 0.0047 < Q^2>= 166 GeV^2 < W>= 191 GeV

< x > = 0.0084 < Q^2>= 294 GeV^2 < W>= 187 GeV

< x > = 0.029 < Q^2>= 1103 GeV^2 < W>= 188 GeV

Lepto 6.5 Ariadne 4.08 Herwig 5.8 all MRS(H)

H1 96 preliminary

stat. 1 sys. errors