H1 PRELIMINARY

-0.1 0 0.1 0.2

10 Q^2 [GeV^2] r_{1-1}^1

0 0.1 0.2 0.3

40 60 80 100

W [GeV] r_{1-1}^1

0.05 0.1 0.15 0.2

0 0.2 0.4

|t| [GeV^2] r_{1-1}^1