H1 PRELIMINARY

0 25 50 75 100

0 100 200 300 Φ [deg.]

dN/dΦ

0 20 40 60 80

0 100 200 300 Φ [deg.]

dN/dΦ

0 10 20 30 40

0 100 200 300 Φ [deg.]

dN/dΦ

0 10 20 30 40

0 100 200 300 Φ [deg.]

dN/dΦ