Events / 100 MeV/c^2

135GeV<W<160GeV 160GeV<W<185GeV

Events / 100 MeV/c^2

185GeV<W<210GeV 210GeV<W<235GeV

m_{ee} [ GeV ]

Events / 100 MeV/c^2

235GeV<W<260GeV

m_{ee} [ GeV ]

260GeV<W<285GeV

0 10 20 30 40

0 2 4 6

0 10 20 30 40 50

0 2 4 6

0 10 20 30 40

0 2 4 6

0

10

20

30

0 2 4 6

0

10

20

30

0 2 4 6 0 10 20 30 40

0 2 4 6