0 2 4 6 8 10 Momentum ΜGeV/cΝ 0.0

10.0

20.0

30.0

Φ Muons per 0.5 GeV/c

(a)

0 30 60 90 120 150 180 Polar Angle θ 0.0

10.0

20.0

Φ Muons per 5 Degrees

(b)