0 200 400 600 800 1000

1200

1400

1600

1800 x 10^2

0 0.2 0.4 μ = (0.132 ± 0.005) GeV/c^2 σ = (0.012 ± 0.000) GeV/c^2

m_{γγ} [GeV/c^2] 0 5000

10000

15000

20000

25000

30000

35000

40000

0 0.2 0.4 μ = (0.135 ± 0.005) GeV/c^2 σ = (0.013 ± 0.001) GeV/c^2

m_{γγ} [GeV/c^2]

0 10000

20000

30000

40000

50000

0 0.2 0.4 μ = (0.132 ± 0.005) GeV/c^2 σ = (0.013 ± 0.001) GeV/c^2

m_{γγ} [GeV/c^2] 0 2500

5000

7500

10000

12500

15000

17500

20000

0 0.2 0.4 μ = (0.132 ± 0.005) GeV/c^2 σ = (0.013 ± 0.001) GeV/c^2

m_{γγ} [GeV/c^2]